0 5 10 15 20 25

0

2

4

6

8

10 x 10^{-3}

163

40

67

21

283

554

17

615

77

94

113

9

33

23

129

12

27

148

441

40

62

95

11

125

14

22

11

29

53

51

178

Stack over 65 stations for each LFE P-wave (displacement)